\section{The 3D widgets}

\subsection{The coordinate system widget}
foo

If nothing else is stated, the length of the axis shown 
in the following are 5 (in the units discussed above).
This length is measured from where the 3 axis cylinders join to the end
of the cone -- therefore, if we 
place a small sphere at 
the point (5,0,0), it will look like this:

%\begin{latexonly}
%\begin{center}
%\fbox{\includegraphics[width=4cm]{Widgets_3D/Test_of_1.0/snap.ps}}
foo text
%\end{center}
%\end{latexonly}

\begin{rawhtml}
<p>
<center>
<img alt="" 
 src="http://www.astro.ku.dk/~milvang/RelViz/Widgets_3D/Test_of_1.0/snap.gif">
</center>
<p>
\end{rawhtml}

\subsection{The horizon widget}
foo

\subsection{The static limit / ergosphere widget}
foo


